Title: Acknowledgements
Course: Learning Design and Development

All who contributed

Acknowledgements

Appreciation is due to the:

Developers: Maria Augusti (Computer Programmer/ Instructional Designer, IEMT, OUT) and Regina Monyemangene (Assistance Lecturer, Instructional Designer, IEMT, OUT);

Reviewers: Dr. Neville Reuben and Chausiku Mwinyimbegu (Quality Assurance Officer and Editor, OUT Library);

Project Coordinator: Ms Maria Augusti (IEMT,OUT);

With support from:

Open University of Tanzania (OUT) Management; and

Brenda Mallinson, OER Africa / South African Institute of Distance Education (Saide).