Title: Assignment
Course: ED 2216 - IT Teaching methods > Section: Topic 5 - Computer Laboratory

Go back to the previous reading in the Pre-readings section together with a lecture material you have learned above.

Visit any school then think, re-design and prepare a rough sketch of a computer lab that you will suggest it to the School Management. If your school does not yet have one, think and recommend a suitable venue for the designing of ideal Computer Lab (assume a space of 35 computers).