Title: E-Tivity 10.2
Course: Monitoring and Evaluation > Section: Unit 10

1. The tutor will direct face-to-face discussion on analysing data and reporting the results using the guide provided on article R10.1 A step by step guide to monitoring and evaluation page 16-17.

1. The tutor will also guide you on how to identify trends and key lessons from the data collected.

1. Take notes as you will use this knowledge to complete the online tasks E10.3.