Title: Assessment 2.1
Course: Monitoring and Evaluation > Section: Unit 2

1. Draw a concept map with M&E at the centre and show the different elements of an M&E system. You can find a sample concept map here. You can either draw the concept map by hand, take a photograph and post it on the VLE or use a concept mapping software to make it.
2. Post your concept map on the VLE.