Title: Unit-level overview
Course: Monitoring and Evaluation > Section: Unit 2

Unit-level overview | Unit/week/section | 2.
Topic name: | Elements and Components of Monitoring and Evaluation
Aim of the topic: | This unit aims at helping you understand the various elements and components of M&E.
This topic covers:
1. Elements of an M&E system
2. Components of an M&E system
Intended learning outcomes:
At the end of this topic, you will be able to:

1. Describe various elements of an M&E system
2. Explain the components of an M&E system
Overview of student activity: | After learning the key terms of M&E in Unit 1, you need to gain more foundational knowledge on M&E which will be useful in the units that follow. Elements and components of an M&E system are the building blocks that spell out the stages and functions required to measure the progress and results of a project.